-- https://dev.mysql.com/doc/refman/8.0/en/drop-logfile-group.html

/* DROP LOGFILE GROUP logfile_group
    ENGINE [=] engine_name */


DROP LOGFILE GROUP logfile_group ENGINE = engine_name;
DROP LOGFILE GROUP logfile_group ENGINE engine_name;
