-- https://dev.mysql.com/doc/refman/8.0/en/drop-spatial-reference-system.html

/* DROP SPATIAL REFERENCE SYSTEM
    [IF EXISTS]
    srid

srid: 32-bit unsigned integer */


DROP SPATIAL REFERENCE SYSTEM IF EXISTS 4120;
DROP SPATIAL REFERENCE SYSTEM 4120;
